interface Props {
  width?: number;
  height?: number;
}

const Logo: React.FC<Props> = ({ width, height }) => {
  return (
    <svg
      width={width}
      height={height}
      viewBox="0 0 600 160"
      xmlns="http://www.w3.org/2000/svg"
    >
      <g clipPath="url(#a)">

        <path id="logo"
          fill="#89ba17" stroke="#89ba17" strokeWidth="1"
          d="M 98.00,125.00
            C 92.11,126.67 84.23,126.00 78.00,126.00
              68.19,126.00 48.68,126.75 40.00,125.00
              27.52,122.47 22.07,121.19 22.00,107.00
              22.00,107.00 22.00,69.00 22.00,69.00
              22.00,69.00 22.00,14.00 22.00,14.00
              22.05,5.34 22.68,5.01 31.00,5.00
              31.00,5.00 102.00,5.00 102.00,5.00
              110.70,5.00 127.55,3.92 134.89,8.17
              140.49,11.41 140.99,20.28 141.00,26.00
              141.00,26.00 141.00,106.00 141.00,106.00
              140.87,116.09 137.86,124.22 127.00,126.00
              129.69,135.43 138.05,146.15 143.00,155.00
              143.00,155.00 122.00,155.00 122.00,155.00
              119.94,154.96 117.97,154.99 116.09,153.98
              108.90,150.11 101.06,132.66 98.00,125.00 Z
            M 117.00,63.00
            C 118.38,61.59 119.34,60.82 120.15,58.91
              121.55,55.66 121.03,39.55 121.00,35.00
              120.98,32.44 121.16,29.40 119.40,27.31
              117.13,24.62 113.18,25.01 110.00,25.00
              110.00,25.00 41.00,25.00 41.00,25.00
              41.00,25.00 41.00,94.00 41.00,94.00
              41.02,103.96 43.04,105.98 53.00,106.00
              53.00,106.00 109.00,106.00 109.00,106.00
              112.89,105.99 116.78,106.36 119.40,102.85
              120.97,100.76 120.95,98.48 121.00,96.00
              121.00,96.00 121.00,77.00 121.00,77.00
              121.00,74.53 121.23,69.15 120.40,67.04
              119.56,64.88 118.64,64.40 117.00,63.00 Z
            M 63.28,44.02
            C 68.39,42.11 83.71,42.99 90.00,43.00
              92.24,43.00 95.60,42.76 97.52,43.99
              102.64,47.27 102.06,57.49 91.00,57.06
              91.00,57.06 69.00,57.06 69.00,57.06
              59.54,56.82 57.81,49.29 63.28,44.02 Z
            M 67.00,71.77
            C 72.50,70.45 92.23,69.98 96.67,73.12
              101.81,76.75 101.81,83.25 96.67,86.88
              93.42,89.17 89.77,88.99 86.00,89.00
              81.46,89.01 69.12,89.69 65.59,87.89
              59.02,84.54 57.78,75.89 67.00,71.77 Z
            M 39.00,156.00
            C 34.34,151.96 27.34,150.74 26.23,142.00
              23.80,123.04 55.16,121.09 53.21,142.00
              52.36,151.13 46.43,151.19 41.00,156.00
              41.00,156.00 39.00,156.00 39.00,156.00 Z" />

        <path id="word"
          fill="#111927" stroke="#111927" strokeWidth="1"
          d="M 273.00,64.00
            C 273.00,64.00 279.96,66.35 279.96,66.35
              283.26,67.45 289.15,67.63 290.83,63.79
              292.28,60.49 288.42,58.94 286.00,58.25
              280.11,56.58 271.13,54.92 274.07,46.02
              276.86,37.57 292.63,39.22 294.98,42.51
              295.94,43.85 295.87,45.45 296.00,47.00
              296.00,47.00 289.09,44.57 289.09,44.57
              286.05,43.59 281.65,43.59 280.17,47.12
              278.56,50.95 283.39,52.15 286.00,52.79
              292.11,54.28 299.39,56.90 296.26,64.98
              295.44,67.10 293.96,68.76 291.96,69.83
              288.78,71.52 277.32,71.71 274.60,69.15
              273.06,67.70 273.16,65.92 273.00,64.00 Z
            M 302.00,40.00
            C 302.00,40.00 307.00,40.00 307.00,40.00
              307.00,40.00 307.00,50.00 307.00,50.00
              308.87,49.13 309.89,48.55 312.00,48.22
              325.06,46.23 322.00,62.86 322.00,71.00
              322.00,71.00 317.00,71.00 317.00,71.00
              317.00,66.86 318.55,54.23 313.86,52.66
              305.09,49.71 307.00,66.60 307.00,71.00
              307.00,71.00 302.00,71.00 302.00,71.00
              302.00,71.00 302.00,40.00 302.00,40.00 Z
            M 157.00,41.00
            C 157.00,41.00 183.00,41.00 183.00,41.00
              183.00,41.00 183.00,44.00 183.00,44.00
              183.00,44.00 172.00,44.00 172.00,44.00
              172.00,44.00 172.00,71.00 172.00,71.00
              172.00,71.00 167.00,71.00 167.00,71.00
              167.00,71.00 167.00,44.00 167.00,44.00
              167.00,44.00 157.00,44.00 157.00,44.00
              157.00,44.00 157.00,41.00 157.00,41.00 Z
            M 185.00,41.00
            C 185.00,41.00 190.00,41.00 190.00,41.00
              190.00,41.00 190.00,45.00 190.00,45.00
              190.00,45.00 185.00,45.00 185.00,45.00
              185.00,45.00 185.00,41.00 185.00,41.00 Z
            M 376.00,43.00
            C 376.00,43.00 381.00,43.00 381.00,43.00
              381.00,43.00 381.00,49.00 381.00,49.00
              381.00,49.00 389.00,49.00 389.00,49.00
              389.00,49.00 389.00,52.00 389.00,52.00
              389.00,52.00 381.00,52.00 381.00,52.00
              381.00,61.12 378.83,67.31 389.00,67.00
              389.00,67.00 389.00,71.00 389.00,71.00
              386.40,71.00 381.43,71.34 379.28,69.98
              376.03,67.93 376.07,63.38 376.00,60.00
              375.87,52.92 374.81,53.04 374.66,50.88
              374.66,50.88 376.00,43.00 376.00,43.00 Z
            M 196.00,49.00
            C 203.74,49.22 208.06,46.10 215.00,51.00
              216.53,49.59 216.89,49.01 219.04,48.42
              232.76,44.68 230.00,63.05 230.00,71.00
              230.00,71.00 225.00,71.00 225.00,71.00
              225.00,67.38 225.83,55.92 223.40,53.61
              221.11,51.43 217.51,52.79 216.02,55.23
              214.46,57.77 215.00,67.59 215.00,71.00
              215.00,71.00 211.00,71.00 211.00,71.00
              211.00,71.00 210.00,52.00 210.00,52.00
              198.46,52.40 201.00,59.98 201.00,71.00
              201.00,71.00 196.00,71.00 196.00,71.00
              196.00,71.00 196.00,49.00 196.00,49.00 Z
            M 255.00,65.00
            C 254.89,66.43 254.98,68.06 254.01,69.26
              251.66,72.16 241.90,71.20 239.11,69.26
              235.23,66.57 234.80,62.35 235.04,58.00
              235.74,45.76 248.98,46.93 252.58,49.89
              255.57,52.35 255.83,56.45 256.00,60.00
              256.00,60.00 239.00,60.00 239.00,60.00
              243.90,69.61 246.16,67.32 255.00,65.00 Z
            M 347.00,65.00
            C 346.89,66.43 346.98,68.06 346.01,69.26
              343.66,72.16 333.90,71.20 331.11,69.26
              327.23,66.57 326.80,62.35 327.04,58.00
              327.74,45.76 340.98,46.93 344.58,49.89
              347.57,52.35 347.83,56.45 348.00,60.00
              348.00,60.00 331.00,60.00 331.00,60.00
              335.90,69.61 338.16,67.32 347.00,65.00 Z
            M 371.00,65.00
            C 370.89,66.43 370.98,68.06 370.01,69.26
              367.66,72.16 357.90,71.20 355.11,69.26
              351.23,66.57 350.80,62.35 351.04,58.00
              351.74,45.76 364.98,46.93 368.58,49.89
              371.57,52.35 371.83,56.45 372.00,60.00
              372.00,60.00 355.00,60.00 355.00,60.00
              359.90,69.61 362.16,67.32 371.00,65.00 Z
            M 185.00,49.00
            C 185.00,49.00 190.00,49.00 190.00,49.00
              190.00,49.00 190.00,71.00 190.00,71.00
              190.00,71.00 185.00,71.00 185.00,71.00
              185.00,71.00 185.00,49.00 185.00,49.00 Z
            M 251.00,57.00
            C 248.78,49.99 242.22,49.99 240.00,57.00
              240.00,57.00 251.00,57.00 251.00,57.00 Z
            M 343.00,57.00
            C 340.78,49.99 334.22,49.99 332.00,57.00
              332.00,57.00 343.00,57.00 343.00,57.00 Z
            M 367.00,57.00
            C 364.78,49.99 358.22,49.99 356.00,57.00
              356.00,57.00 367.00,57.00 367.00,57.00 Z
            M 436.00,114.00
            C 436.00,114.00 442.96,116.35 442.96,116.35
              446.26,117.45 452.15,117.63 453.83,113.79
              455.28,110.49 451.42,108.94 449.00,108.25
              443.11,106.58 434.13,104.92 437.07,96.02
              439.86,87.57 455.63,89.22 457.98,92.51
              458.94,93.85 458.87,95.45 459.00,97.00
              459.00,97.00 452.09,94.57 452.09,94.57
              449.04,93.58 444.65,93.58 443.17,97.12
              441.56,100.95 446.39,102.15 449.00,102.79
              455.11,104.28 462.39,106.90 459.26,114.98
              458.44,117.10 456.96,118.76 454.96,119.83
              451.78,121.52 440.32,121.71 437.60,119.15
              436.06,117.70 436.16,115.92 436.00,114.00 Z
            M 157.00,91.00
            C 157.00,91.00 162.61,92.02 162.61,92.02
              162.61,92.02 170.00,106.00 170.00,106.00
              177.91,92.10 174.45,91.11 184.00,91.00
              184.00,91.00 184.00,121.00 184.00,121.00
              184.00,121.00 179.00,121.00 179.00,121.00
              179.00,121.00 178.00,99.00 178.00,99.00
              177.37,101.20 176.72,102.92 175.74,105.00
              175.74,105.00 173.82,108.94 173.82,108.94
              168.16,119.26 163.33,102.21 161.00,98.00
              161.00,98.00 161.00,121.00 161.00,121.00
              161.00,121.00 157.00,121.00 157.00,121.00
              157.00,121.00 157.00,91.00 157.00,91.00 Z
            M 407.00,93.00
            C 407.00,93.00 412.00,93.00 412.00,93.00
              412.00,93.00 412.00,99.00 412.00,99.00
              412.00,99.00 420.00,99.00 420.00,99.00
              420.00,99.00 420.00,102.00 420.00,102.00
              420.00,102.00 412.00,102.00 412.00,102.00
              412.00,111.12 409.83,117.31 420.00,117.00
              420.00,117.00 420.00,121.00 420.00,121.00
              417.40,121.00 412.43,121.34 410.28,119.98
              407.03,117.93 407.07,113.38 407.00,110.00
              406.87,102.92 405.81,103.04 405.66,100.88
              405.66,100.88 407.00,93.00 407.00,93.00 Z
            M 509.00,93.00
            C 509.00,93.00 514.00,93.00 514.00,93.00
              514.00,93.00 514.00,99.00 514.00,99.00
              514.00,99.00 522.00,99.00 522.00,99.00
              522.00,99.00 522.00,102.00 522.00,102.00
              522.00,102.00 514.00,102.00 514.00,102.00
              514.00,111.12 511.83,117.31 522.00,117.00
              522.00,117.00 522.00,121.00 522.00,121.00
              519.40,121.00 514.43,121.34 512.28,119.98
              509.03,117.93 509.07,113.38 509.00,110.00
              508.87,102.92 507.81,103.04 507.66,100.88
              507.66,100.88 509.00,93.00 509.00,93.00 Z
            M 192.00,98.00
            C 195.50,98.00 203.01,97.51 205.86,99.17
              211.43,102.43 210.00,115.23 210.00,121.00
              210.00,121.00 204.00,119.00 204.00,119.00
              200.99,120.95 196.49,121.95 193.15,119.98
              189.29,117.70 189.14,111.56 192.31,108.65
              195.64,105.61 200.82,106.00 205.00,106.00
              201.16,99.85 198.26,102.13 192.00,103.00
              192.00,103.00 192.00,98.00 192.00,98.00 Z
            M 216.00,98.87
            C 220.38,99.12 228.84,97.41 231.79,98.87
              237.70,101.40 236.00,115.33 236.00,121.00
              236.00,121.00 231.00,121.00 231.00,121.00
              231.00,116.86 232.55,104.23 227.86,102.66
              219.09,99.71 221.00,116.60 221.00,121.00
              221.00,121.00 216.00,121.00 216.00,121.00
              216.00,121.00 216.00,98.87 216.00,98.87 Z
            M 243.00,98.00
            C 246.50,98.00 254.01,97.51 256.86,99.17
              262.43,102.43 261.00,115.23 261.00,121.00
              261.00,121.00 255.00,119.00 255.00,119.00
              251.99,120.95 247.49,121.95 244.15,119.98
              240.29,117.70 240.14,111.56 243.31,108.65
              246.64,105.61 251.82,106.00 256.00,106.00
              252.15,99.83 249.27,102.13 243.00,103.00
              243.00,103.00 243.00,98.00 243.00,98.00 Z
            M 282.00,119.13
            C 278.29,120.96 273.05,122.20 269.39,119.13
              264.34,115.21 264.93,103.43 270.13,99.74
              274.38,96.72 281.15,98.61 286.00,99.00
              286.00,104.01 286.79,121.40 284.83,124.89
              282.62,128.82 272.05,131.16 269.02,127.40
              268.16,126.34 268.21,125.22 268.00,124.00
              274.88,124.97 279.06,127.33 282.00,119.13 Z
            M 312.00,115.00
            C 311.89,116.43 311.98,118.06 311.01,119.26
              308.66,122.16 298.90,121.20 296.11,119.26
              292.23,116.57 291.80,112.35 292.04,108.00
              292.74,95.76 305.98,96.93 309.58,99.89
              312.57,102.35 312.83,106.45 313.00,110.00
              313.00,110.00 296.00,110.00 296.00,110.00
              300.90,119.61 303.16,117.32 312.00,115.00 Z
            M 317.00,99.00
            C 324.74,99.22 329.06,96.10 336.00,101.00
              337.53,99.59 337.89,99.01 340.04,98.42
              353.76,94.68 351.00,113.05 351.00,121.00
              351.00,121.00 346.00,121.00 346.00,121.00
              346.00,117.38 346.83,105.92 344.40,103.61
              342.11,101.43 338.51,102.79 337.02,105.23
              335.46,107.77 336.00,117.59 336.00,121.00
              336.00,121.00 332.00,121.00 332.00,121.00
              332.00,121.00 331.00,102.00 331.00,102.00
              319.46,102.40 322.00,109.98 322.00,121.00
              322.00,121.00 317.00,121.00 317.00,121.00
              317.00,121.00 317.00,99.00 317.00,99.00 Z
            M 376.00,115.00
            C 375.89,116.43 375.98,118.06 375.01,119.26
              372.66,122.16 362.90,121.20 360.11,119.26
              356.23,116.57 355.80,112.35 356.04,108.00
              356.74,95.76 369.98,96.93 373.58,99.89
              376.57,102.35 376.83,106.45 377.00,110.00
              377.00,110.00 360.00,110.00 360.00,110.00
              364.90,119.61 367.16,117.32 376.00,115.00 Z
            M 381.00,98.87
            C 385.38,99.12 393.84,97.41 396.79,98.87
              402.70,101.40 401.00,115.33 401.00,121.00
              401.00,121.00 396.00,121.00 396.00,121.00
              396.00,116.86 397.55,104.23 392.86,102.66
              384.09,99.71 386.00,116.60 386.00,121.00
              386.00,121.00 381.00,121.00 381.00,121.00
              381.00,121.00 381.00,98.87 381.00,98.87 Z
            M 487.00,115.00
            C 487.00,115.00 491.91,116.46 491.91,116.46
              494.00,117.05 500.41,117.10 498.09,113.51
              496.44,110.95 484.14,110.92 487.74,102.11
              489.53,97.73 500.09,96.13 503.01,99.74
              503.98,100.94 503.89,102.57 504.00,104.00
              498.64,102.61 495.27,100.21 492.00,106.00
              492.00,106.00 499.00,107.76 499.00,107.76
              500.28,108.23 501.65,108.78 502.63,109.70
              505.52,112.21 505.44,116.67 502.63,119.19
              499.97,121.32 490.29,122.09 487.99,119.19
              487.02,118.06 487.11,116.43 487.00,115.00 Z
            M 544.00,115.00
            C 543.89,116.43 543.98,118.06 543.01,119.26
              540.66,122.16 530.90,121.20 528.11,119.26
              524.23,116.57 523.80,112.35 524.04,108.00
              524.74,95.76 537.98,96.93 541.58,99.89
              544.57,102.35 544.83,106.45 545.00,110.00
              545.00,110.00 528.00,110.00 528.00,110.00
              532.90,119.61 535.16,117.32 544.00,115.00 Z
            M 549.00,99.00
            C 556.74,99.22 561.06,96.10 568.00,101.00
              569.53,99.59 569.89,99.01 572.04,98.42
              585.76,94.68 583.00,113.05 583.00,121.00
              583.00,121.00 578.00,121.00 578.00,121.00
              578.00,117.38 578.83,105.92 576.40,103.61
              574.11,101.43 570.51,102.79 569.02,105.23
              567.46,107.77 568.00,117.59 568.00,121.00
              568.00,121.00 564.00,121.00 564.00,121.00
              564.00,121.00 563.00,102.00 563.00,102.00
              551.46,102.40 554.00,109.98 554.00,121.00
              554.00,121.00 549.00,121.00 549.00,121.00
              549.00,121.00 549.00,99.00 549.00,99.00 Z
            M 462.00,99.00
            C 469.26,99.58 470.86,106.68 472.00,113.00
              475.66,109.29 477.60,103.97 479.00,99.00
              479.00,99.00 484.00,99.00 484.00,99.00
              482.98,104.44 477.74,115.52 475.23,121.00
              472.81,126.28 473.09,128.52 467.00,129.00
              467.00,129.00 469.41,119.00 469.41,119.00
              469.41,119.00 462.00,99.00 462.00,99.00 Z
            M 277.00,101.82
            C 267.95,103.22 269.81,116.73 276.01,117.09
              283.99,117.55 282.64,104.87 280.40,102.95
              279.21,101.93 278.35,102.08 277.00,101.82 Z
            M 308.00,107.00
            C 305.78,99.99 299.22,99.99 297.00,107.00
              297.00,107.00 308.00,107.00 308.00,107.00 Z
            M 372.00,107.00
            C 369.78,99.99 363.22,99.99 361.00,107.00
              361.00,107.00 372.00,107.00 372.00,107.00 Z
            M 540.00,107.00
            C 537.78,99.99 531.22,99.99 529.00,107.00
              529.00,107.00 540.00,107.00 540.00,107.00 Z
            M 205.00,110.07
            C 205.00,110.07 200.02,110.07 200.02,110.07
              189.01,111.90 199.07,122.25 203.98,114.70
              204.91,113.26 204.87,111.63 205.00,110.07 Z
            M 256.00,110.07
            C 256.00,110.07 251.02,110.07 251.02,110.07
              240.01,111.90 250.07,122.25 254.98,114.70
              255.91,113.26 255.87,111.63 256.00,110.07 Z" />
              
        {/* <path
                d="M213 34.5h61.4v11.9h-24.9V127h-12.4V46.4H213v-12ZM361.1 51c-3.2-1.7-6.7-3-10.4-4.3a36.2 36.2 0 0 0-11-1.7c-5 0-9 1.1-12 3.4a11.2 11.2 0 0 0-4.3 9.2c0 3 1 5.4 2.8 7.4 2 2 4.4 3.7 7.5 5.2 3 1.4 6.2 2.8 9.6 4 2.9 1.2 5.7 2.4 8.5 3.8a31 31 0 0 1 7.6 5.1 21 21 0 0 1 5.4 7.5c1.3 3 2 6.7 2 11.2a24.8 24.8 0 0 1-14 22.8 35.1 35.1 0 0 1-16.2 3.4 48.4 48.4 0 0 1-22-5c-3.2-1.5-6-3-8.5-4.7l5.6-9.7A59 59 0 0 0 327 116a33 33 0 0 0 8.5 1.1 25 25 0 0 0 8.5-1.5c3-1.1 5.3-2.8 7.2-5 1.9-2.2 2.8-5.1 2.8-8.8 0-3.2-.8-5.8-2.5-7.8-1.7-2.2-3.8-4-6.6-5.4a68 68 0 0 0-8.7-4.1l-8.8-3.6c-3-1.3-5.8-3-8.3-4.8-2.6-2-4.6-4.4-6.2-7.2a21.1 21.1 0 0 1-2.3-10.3A23 23 0 0 1 324 37.4c4.1-2.1 8.8-3.3 14-3.5a51.6 51.6 0 0 1 28 7.6l-4.7 9.5Zm45.8 76V31.5h.1l48.5 68.9-5.2-1 48.4-67.9h.2V127h-12.3V59.7l.8 6.2-35 49.5h-.2l-35.5-49.5 2.2-5.7V127h-12Zm185.7-76c-3.2-1.7-6.6-3-10.4-4.3a36.2 36.2 0 0 0-11-1.7c-5 0-9 1.1-11.9 3.4a11.2 11.2 0 0 0-4.3 9.2c0 3 .9 5.4 2.8 7.4 1.8 2 4.3 3.7 7.4 5.2 3 1.4 6.3 2.8 9.6 4 2.9 1.2 5.8 2.4 8.6 3.8A31 31 0 0 1 591 83a21 21 0 0 1 5.4 7.5c1.4 3 2 6.7 2 11.2a24.8 24.8 0 0 1-14 22.8 35.1 35.1 0 0 1-16.2 3.4 48.4 48.4 0 0 1-22-5c-3.1-1.5-6-3-8.4-4.7l5.5-9.7a59 59 0 0 0 15.3 7.4 33 33 0 0 0 8.5 1.1 25 25 0 0 0 8.6-1.5c2.9-1.1 5.3-2.8 7.1-5 2-2.2 2.8-5.1 2.8-8.8 0-3.2-.8-5.8-2.5-7.8-1.6-2.2-3.8-4-6.5-5.4a68 68 0 0 0-8.7-4.1c-3-1.1-5.9-2.3-8.9-3.6-3-1.3-5.7-3-8.3-4.8a21.1 21.1 0 0 1-8.4-17.4 23 23 0 0 1 13.1-21.3c4.1-2.1 8.8-3.3 14.1-3.5a51.6 51.6 0 0 1 28 7.6l-4.8 9.5Z"
                fill="#111927"
              /> */}
        {/* <rect
              x="5.5"
              y="5.5"
              width="149"
              height="149"
              rx="18.5"
              stroke="#111927"
              strokeWidth="11"
            />
            <path
              stroke="#111927"
              strokeWidth="11"
              d="M26 35.5h108M51 65.5h83M92 95.5h42M26 125.5h108"
            /> */}
      </g>
      <defs>
        <clipPath id="a">
          <path fill="#fff" d="M0 0h600v160H0z" />
        </clipPath>
      </defs>
    </svg>
  );
};

export default Logo;
